<template>
  <boiler-db-list v-if="ifBoiler" />
  <original-db-list v-else />
</template>
<script>
import originalDbList from './components/original_db_list'
import boilerDbList from './components/boiler_db_list'
export default {
  name: 'TODOReport',
  components: { originalDbList, boilerDbList },
  data() {
    return {
      ifBoiler: this.$store.getters.departmentId === 75
    }
  }
}
</script>
