<template>
  <elFrame :src="oldURL" style="width: 100%" />
</template>

<script>
import elFrame from '@/components/Iframe/index'
export default {
  name: 'OldProject',
  components: { elFrame },
  data() {
    return {
      oldURL: process.env.VUE_APP_OLD_API + 'user/index'
    }
  }
}
</script>
